Highlights of DB2 V2.1.0 Performance Improvements

Table 1. Highlights of DB2 V2.1.0 vs. DB2 V1.2 Function Improvement on AIX Improvement on OS/2 OLTP Performance up to 23% up to 40% SPEC benchmark 19-53% 39-42% RQW benchmark 27-46% - Customer benchmark 1 65-83% - Customer benchmark 2 44% - Table scans 41% 39% Index scans - 16-68% Dynamic SQL caching new feature new feature db2batch tool new feature new feature Sorting 79% - Import 77% - Load 1.7GB/hr 1.4GB/hr Create Index 16-40% 67% RUNSTATS 39% 31% Backup/Restore 14GB/hour+ 9GB/hour+ Reorg 55-58% 47% DDCS up to 49% up to 48%

The above table was extracted from DB2 V2.1.0 Performance Report. For details, refer to that report.

Most of the numbers shown are percentage reductions in elapsed time, with 100% the maximum possible; e.g., a 50% reduction means “twice as fast.”